بواسطة: Mohammad Volkman Jr.

A very honest and professional company
itic software is definitely my top choice after testing tens, if not hundreds of systems over the years. These systems have been the most efficient and provided the results I have been seeking throughout my trading venture. I recently contacted the team to recode a repaint indicator into a non-repaint one, which now works wonderfully with no issues. I also recommend the Elliot Wave software. All the EA’s and the software I purchased has been working seamlessly, and if any questions or concerns arise, the team is always there to help.