بواسطة: Rey Cummerata

DAAS works as promised!
I wanted to note that I have purchased a latency arbitrage system from ITIC Software and it has been a wonderful experience for me. I am extremely satisfied with the support that resolved all of my issues, in a prompt manner. The system itself also delivers results as promised, and I will most definitely be using ITIC Sofware to purchase systems in the future.